\documentclass[11pt,a4paper,conference]{IEEEtran}

% If IEEEtran.cls has not been installed into the LaTeX system files,
% manually specify the path to it like:
% \documentclass[conference]{../sty/IEEEtran}

% Some very useful LaTeX packages include:
% (uncomment the ones you want to load)


\begin{document}
%
% paper title
% can use linebreaks \\ within to get better formatting as desired
\title{Bare Demo of IEEEtran.cls for BIOMATH}


% author names and affiliations
% use a multiple column layout for up to two different
% affiliations

\author{\IEEEauthorblockN{First Author's Names}
\IEEEauthorblockA{line 1 (of Affiliation): dept. name of organization\\
line 2: name of organization, acronyms acceptable\\
line 3: City, Country\\
line 4: Email: name@xyz.com}
\and
\IEEEauthorblockN{Second Author's Names }
\IEEEauthorblockA{line 1 (of Affiliation): dept. name of organization\\
line 2: name of organization, acronyms acceptable\\
line 3: City, Country\\
line 4: Email: name@xyz.com}
}

% conference papers do not typically use \thanks and this command
% is locked out in conference mode. If really needed, such as for
% the acknowledgment of grants, issue a \IEEEoverridecommandlockouts
% after \documentclass

% for three or more authors, or if they all won't fit within the width
% of the page, use this alternative format:
%
%\author{\IEEEauthorblockN{First Author\IEEEauthorrefmark{1},
%Second Author\IEEEauthorrefmark{2},
%Third Author\IEEEauthorrefmark{3} and
%Fourth Author\IEEEauthorrefmark{2}\IEEEauthorrefmark{3}}
%\IEEEauthorblockA{\IEEEauthorrefmark{1}line 1 (of Affiliation): dept. name of organization\\
%line 2: name of organization, City, Country\\
%line 3: Email: name@xyz1.com}
%\IEEEauthorblockA{\IEEEauthorrefmark{2}line 1 (of Affiliation): dept. name of organization\\
%line 2: name of organization, City, Country
%line 3: Email: name@xyz2.com}
%\IEEEauthorblockA{\IEEEauthorrefmark{3}line 1 (of Affiliation): dept. name of organization\\
%line 2: name of organization, acronyms acceptable, City, Country\\
%line 3: Email: name@xyz3.com}
%}




% use for special paper notices
%\IEEEspecialpapernotice{(Invited Paper)}




% make the title area
\maketitle


\begin{abstract}
The abstract goes here. DO NOT USE SPECIAL CHARACTERS, SYMBOLS, OR MATH IN YOUR TITLE OR ABSTRACT.

\end{abstract}

\begin{IEEEkeywords}
component; formatting; style; styling;

\end{IEEEkeywords}


\section{Introduction}
% no \IEEEPARstart
This demo file is intended to serve as a ``starter file''
for IEEE conference papers produced under \LaTeX\ using
IEEEtran.cls version 1.7 and later.

All manuscripts must be in English. These guidelines include complete descriptions of the fonts, spacing, and related information for producing your proceedings manuscripts. Please follow them and if you have any questions, direct them to the production editor in charge of your proceedings at Conference Publishing Services (CPS): Phone +1 (714) 821-8380 or Fax +1 (714) 761-1784.
% You must have at least 2 lines in the paragraph with the drop letter
% (should never be an issue)

\subsection{Subsection Heading Here}
Subsection text here.


\subsubsection{Subsubsection Heading Here}
Subsubsection text here.

\section{Type style and Fonts}
Wherever Times is specified, Times Roman or Times New Roman may be used. If neither is available on your system, please use the font closest in appearance to Times. Avoid using bit-mapped fonts if possible. True-Type 1 or Open Type fonts are preferred. Please embed symbol fonts, as well, for math, etc.


% An example of a floating figure using the graphicx package.
% Note that \label must occur AFTER (or within) \caption.
% For figures, \caption should occur after the \includegraphics.
% Note that IEEEtran v1.7 and later has special internal code that
% is designed to preserve the operation of \label within \caption
% even when the captionsoff option is in effect. However, because
% of issues like this, it may be the safest practice to put all your
% \label just after \caption rather than within \caption{}.
%
% Reminder: the "draftcls" or "draftclsnofoot", not "draft", class
% option should be used if it is desired that the figures are to be
% displayed while in draft mode.
%
%\begin{figure}[!t]
%\centering
%\includegraphics[width=2.5in]{myfigure}
% where an .eps filename suffix will be assumed under latex,
% and a .pdf suffix will be assumed for pdflatex; or what has been declared
% via \DeclareGraphicsExtensions.
%\caption{Simulation Results}
%\label{fig_sim}
%\end{figure}

% Note that IEEE typically puts floats only at the top, even when this
% results in a large percentage of a column being occupied by floats.


% An example of a double column floating figure using two subfigures.
% (The subfig.sty package must be loaded for this to work.)
% The subfigure \label commands are set within each subfloat command, the
% \label for the overall figure must come after \caption.
% \hfil must be used as a separator to get equal spacing.
% The subfigure.sty package works much the same way, except \subfigure is
% used instead of \subfloat.
%
%\begin{figure*}[!t]
%\centerline{\subfloat[Case I]\includegraphics[width=2.5in]{subfigcase1}%
%\label{fig_first_case}}
%\hfil
%\subfloat[Case II]{\includegraphics[width=2.5in]{subfigcase2}%
%\label{fig_second_case}}}
%\caption{Simulation results}
%\label{fig_sim}
%\end{figure*}
%
% Note that often IEEE papers with subfigures do not employ subfigure
% captions (using the optional argument to \subfloat), but instead will
% reference/describe all of them (a), (b), etc., within the main caption.


% An example of a floating table. Note that, for IEEE style tables, the
% \caption command should come BEFORE the table. Table text will default to
% \footnotesize as IEEE normally uses this smaller font for tables.
% The \label must come after \caption as always.
%
%\begin{table}[!t]
%% increase table row spacing, adjust to taste
%\renewcommand{\arraystretch}{1.3}
% if using array.sty, it might be a good idea to tweak the value of
% \extrarowheight as needed to properly center the text within the cells
%\caption{An Example of a Table}
%\label{table_example}
%\centering
%% Some packages, such as MDW tools, offer better commands for making tables
%% than the plain LaTeX2e tabular which is used here.
%\begin{tabular}{|c||c|}
%\hline
%One & Two\\
%\hline
%Three & Four\\
%\hline
%\end{tabular}
%\end{table}


% Note that IEEE does not put floats in the very first column - or typically
% anywhere on the first page for that matter. Also, in-text middle ("here")
% positioning is not used. Most IEEE journals/conferences use top floats
% exclusively. Note that, LaTeX2e, unlike IEEE journals/conferences, places
% footnotes above bottom floats. This can be corrected via the \fnbelowfloat
% command of the stfloats package.



\section{Conclusion}
The conclusion goes here. this is more of the conclusion

% conference papers do not normally have an appendix


% use section* for acknowledgement
\section*{Acknowledgment}


The authors would like to thank...
more thanks here


% trigger a \newpage just before the given reference
% number - used to balance the columns on the last page
% adjust value as needed - may need to be readjusted if
% the document is modified later
%\IEEEtriggeratref{8}
% The "triggered" command can be changed if desired:
%\IEEEtriggercmd{\enlargethispage{-5in}}

% references section

\begin{thebibliography}{1}

\bibitem{IEEEhowto:kopka}
H.~Kopka and P.~W. Daly, \emph{A Guide to \LaTeX}, 3rd~ed.\hskip 1em plus
  0.5em minus 0.4em\relax Harlow, England: Addison-Wesley, 1999.

\end{thebibliography}


\end{document}


